;
                                 Z33IF.COM                                    

             Size (recs) CRC   Version    Author/Latest Issue      Disk
               4k (26)   0760  1.4        Jay Sage 4/88            Z3COM12

  1- Syntax                                                                   


   Z33IF is the transient IF processor for ZCPR33 adapted from COMIF.COM.

:1


      Syntax:  (1) IF ARG1=ARG2
               (2) IF REGISTER# [VALUE]
               (3) IF CONDITION ARGUMENTS

  Conditions:  T,F,AMBIG,ARCHIVE,BG,COMPR,DS,EMPTY,ERROR,EXIST,INPUT,
               NULL,LIST,REG,RO,SHELL,SYS,TAG,TCAP,VALUE,WHEEL,ZEX
               EQ NE GT GE LT LE = <> >< > >= < <=
          
               Only 1st 2 letters of condition are significant.  
               A leading ~ negates all forms except (1).
  