;
                               Z33DEBUG.LIB                                   

             Size (recs) CRC   Version    Author/Latest Issue      Disk
              27k (214)  2DC2  1.0a       Rob Friefeld 9/87        Z3RCP3

  1- Notes                                                                    

   Z33DEBUG is the DEBUG.LIB  memory utility adapted  for  use with the Z33RCP
library of routines.

   This version includes  the  hex calculator  of  MU3.  The resultant  RCP is
larger than 2k.  With Z33,  it is easy to set up a large RCP.  If you have not
done so, the hex calculator could easily be removed.  Alternatively,  a LOT of 
room  can  be  saved  by using  a  hard coded  CRT protocol  rather  than  the 
generalized  VLIB  routines.   If  your terminal  doesn't  require  any  fancy 
sequences for CLS, EREOL,  AT, GOTOXY,  STNDOUT,  or STNDEND, you can probably
use HARDVID.LIB to replace the equivalent routines in DEBUG.LIB
:1


Notes:

   a. Expanded command synomyms:  "+" "=" "."  <-- advance one block
 	                          "-" ","      <-- back one block
   
   b. Some  relative jumps and djnz's have also been added.   To  save  a  few 
      bytes,  the stndout/stdnend and tinit/dinit routines have  also been de-
      modularized to save a few bytes.

