;
                                SHELLINI.COM                                  

             Size (recs) CRC   Version    Author/Latest Issue      Disk
               1k (1)    191C  1.0        Biff Bueffel 11/87       Z3COM8

  1- Syntax/Usage                                                             


   SHELLINI is  a program  to  initialize the  entire 128 bytes  of the  shell
 stack.  This is necessary for WordStar CP/M Version 4.0 only.

:1


   Syntax:  SHELLINI<cr>


   For  most shells,  only  the first byte of  the  shell stack  needs  to  be
initialized at cold boot,  but this  is not true for WS4.   If you  are having 
problems  with exit from  WS4 while  using  ZCPR  with shell  capability,  run 
SHELLINI.COM before using WS4  (or you may modify your BIOS to initialize  all 
128 bytes of your shell stack).   You may want to include SHELLINI.COM in your 
STARTUP.COM alias.
