;
                               ERRSET.COM                                    

             Size (recs) CRC   Version    Author/Latest Issue      Disk
               1k (8)    1AD0  1.3        Jay Sage 6/87            Z3COM3

  1- Syntax                                                                  



   ERRSET  displays,  clears,  or  sets  error handler  command  line.   Error 
messages are given if there is no message buffer (and hence no external  error 
handling)  or if an attempt is made to load an error command line that is  too 
long.   ERRSET  clears  extraneous  bytes  in the message  buffer  beyond  the 
terminating  null of the new command line.   

   Version 1.3 has been updated to ZCPR3.3 compatibility.
:1


   Syntax:  ERRSET
ionó aó tï ho÷ tï procesó thió line:

   1) replace the command in error with a new command
   2) skip the 