;
                                  ROMAN.COM                                   

             Size (recs) CRC   Version    Author/Latest Issue      Disk
ROMAN.CIM      1k (8)    674F  0.3a       Gene Pizzetta 4/90       Z3COM10
ROMAN.COM      1k (8)    A333  0.3a       Gene Pizzetta 4/90       Z3COM10

  1- Syntax  2- Notes                                                         


   ROMAN is  a Z'ified version of ROMAN.COM  (original by M. Pedder, 10/10/78)
which converts decimal numbers to Roman numerals.


:1
    Syntax   ROMAN {decimal number}


   Decimal number may be from 1-3999.  

   If no number is given, ROMAN will enter interactive mode.  

   ^C to exit.
:2
 ROMAN Notes 

   a. Vs 0.3a updates (04/07/90, Gene Pizzetta):
      - Fixed minor bug that caused strange behavior if  a character less than 
        '0' was entered.

   b. Vs 0.3 updates (04/01/90, Gene Pizzetta):
      - Converted to ZCPR3 utility.  
        Extensively modified screen displays.
        Added command line mode and usage message.

   c. Vs 0.2a updates (02/13/83, D. McLanahan):
      - Modified for CP/M.

   d. Vs 0.2 updates (10/10/78, M. Pedder):
      - From SIG/M disk volume 75
